ADC00 Entries 15810 Mean 290.2 RMS 270.6

0 100 200 300 400 500 600 700 800 900 0 50 100 150 200 250 300 350 Raw ADC 0

cosmic ray test station

avalanche mode

streamer mode 22% streamers at 15 kV